---
title: Feedback
---

Indicates progress or countdown and moves from right to left. 

<Tabs>

<Tab title="Usage">

```jsx
import { ProgressBar } from "twenty-ui/feedback";

export const MyComponent = () => {
  return (
    <ProgressBar
      duration={6000}
      delay={0}
      easing="easeInOut"
      barHeight={10}
      barColor="#4bb543"
      autoStart={true}
    />
  );
};
```

</Tab>

<Tab title="Props">


| Props | Type | Description | Default |
|-------|------|-------------|--------|
| duration | number | The total duration of the progress bar animation in milliseconds | 3 |
| delay | number | The delay in starting the progress bar animation in milliseconds | 0 |
| easing | string | Easing function for the progress bar animation | easeInOut |
| barHeight | number | The height of the bar in pixels | 24 |
| barColor | string | The color of the bar | gray80 |
| autoStart | boolean | If `true`, the progress bar animation starts automatically when the component mounts | `true` |



</Tab>
</Tabs>


## Circular Progress Bar

Indicates the progress of a task, often used in loading screens or areas where you want to communicate ongoing processes to the user. 

<Tabs>

<Tab title="Usage">

```jsx
import { CircularProgressBar } from "@/ui/feedback/progress-bar/components/CircularProgressBar";

export const MyComponent = () => {
  return <CircularProgressBar size={80} barWidth={6} barColor="green" />;
};
```

</Tab>

<Tab title="Props">


| Props | Type | Description | Default |
|-------|------|-------------|--------|
| size | number | The size of the circular progress bar | 50 |
| barWidth | number | The width of the progress bar line | 5 |
| barColor | string | The color of the progress bar | currentColor |



</Tab>

</Tabs>

